0 0.5 1 1.5 2 2.5 3 x 10^4 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

matrix order time distribution

BLOCK SIZE = 40

BANDWITH = 34.00 Mbytes/s

LATENCY = 56.00 us

FLOPS/NODE = 236.00 Mflops

LU PREDICTED TIME DISTRIBUTION ON 64 (4x16) NODES SP2 Latency (dashed) Bandwith (dotted)

Communication (dashed-dotted)

Computation (solid)